ALTER TABLE `proxy_pool` ADD `nome` VARCHAR(64) NULL AFTER `id`;

CREATE TABLE `condes_utenti` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `utente` varchar(32) NOT NULL,
  `pwd` varchar(64) NOT NULL,
  `data` datetime NOT NULL,
  `attivo` tinyint(1) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8

CREATE TABLE `condes_macchine` ( 
  `id` BIGINT NOT NULL AUTO_INCREMENT , 
  `id_proxy_pool` BIGINT NOT NULL , 
  `data` DATETIME NOT NULL , 
  `attivo` BOOLEAN NOT NULL , 
  PRIMARY KEY (`id`)
) ENGINE = InnoDB;

CREATE TABLE `condes_regole` ( 
  `id` BIGINT NOT NULL AUTO_INCREMENT , 
  `id_utenti` BIGINT NOT NULL , 
  `id_condes_macchine` BIGINT NOT NULL , 
  `id_proxy_acl_list` BIGINT NOT NULL , 
  `permanente` BOOLEAN NOT NULL , 
  `data` DATETIME NOT NULL , 
  `attivo` BOOLEAN NOT NULL , 
  `stato` int(11) DEFAULT 0 , 
  `modifica` DATETIME NOT NULL , 
  PRIMARY KEY (`id`)
) ENGINE = InnoDB;

CREATE TABLE `condes_logs` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `id_utenti` bigint(20) NOT NULL,
  `id_condes_regole` bigint(20) NOT NULL,
  `stato` int(11) NOT NULL,
  `data` datetime NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8

